import { Icon } from "@chakra-ui/react";

export default function StopRecordIcon(props) {
  return (
    <Icon {...props}>
      <svg viewBox="0 0 20 20">
        <rect width="20" height="20" rx="1" fill="currentColor" />
      </svg>
    </Icon>
  );
}
