import { Icon } from "@chakra-ui/react";

export default function PauseIcon(props) {
  return (
    <Icon viewBox="0 0 30 30" {...props}>
      <path
        fill="currentColor"
        fill-rule="evenodd"
        clip-rule="evenodd"
        d="M11.514 5.5C11.514 4.11929 10.3947 3 9.01404 3C7.63333 3 6.51404 4.11929 6.51404 5.5V24.5C6.51404 25.8807 7.63333 27 9.01404 27C10.3947 27 11.514 25.8807 11.514 24.5L11.514 5.5ZM23.486 5.5C23.486 4.11929 22.3667 3 20.986 3C19.6053 3 18.486 4.11929 18.486 5.5L18.486 24.5C18.486 25.8807 19.6053 27 20.986 27C22.3667 27 23.486 25.8807 23.486 24.5V5.5Z"
      />
    </Icon>
  );
}
